0 0.002 0.004 0.006 0.008 0.01 0.012 0.014 0.016 0.018 Time

-0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

Value

Waves: quantOut6a, quantOut6aFiltered

quantOut6a quantOut6aFiltered